ALTER TABLE `neckring`.`t_sb_device_connection`
ADD COLUMN `simid` bigint NULL AFTER `DEVICE_ADDRESS`,
ADD COLUMN `status` tinyint(1) NULL COMMENT '0 启用， 1 关闭' AFTER `simid`;
ALTER TABLE `neckring`.`t_nz_jbqid`
    ADD COLUMN `recall` tinyint(1) NULL COMMENT '0 未召回 1 已召回' AFTER `factoryid`